ηΔ -1 0 1 ηΔd assoc Nd t_{rig} N 1

15.4

15.5

15.6

0-10%

Data Fit Background

= 2.76 TeV NNs ALICE, Pb-Pb c < 4 GeV/

T,trig p 3 < c < 3 GeV/

T,assoc p 2 < /2π | < φΔ|

4% scale uncertainty